0 50 100 150 -1 0 1

Amplitude

Abtastwerte

0 500 -1 0 1 Abtastwerte

0 0.01 0.02 0 0.5 1 Frequency in 2π

0 50 100 150 -1 0 1

0 500 -1 0 1

0 0.01 0.02 0 0.5 1